ALTER TABLE `system_users` CHANGE COLUMN `user_pref_language` `user_pref_language` ENUM("en","nl") NOT NULL DEFAULT 'en' COLLATE 'utf8mb4_general_ci' AFTER `user_login_attempts`;
