UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/sources/pageSourceInserve.php' WHERE  `page_uuid`='5b167631-ba04-4452-bb8f-3ae0be8bccb0';
UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/pageSystemConfig.php' WHERE  `page_uuid`='558df250-d6bd-4b81-b23d-99b472b2c72a';
UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/pageMonitoring.php' WHERE  `page_uuid`='a9e542a7-be1e-4e93-a924-7f43ef974e16';
UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/pageAccessControl.php' WHERE  `page_uuid`='c14362c2-7db2-4047-aed2-9569c0b4febf';