UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/sources/pageSourceInserve.php' WHERE  `page_uuid`='5b167631-ba04-4452-bb8f-3ae0be8bccb0';
UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/pageSystemConfig.php' WHERE  `page_uuid`='558df250-d6bd-4b81-b23d-99b472b2c72a';
UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/pageMonitoring.php' WHERE  `page_uuid`='a9e542a7-be1e-4e93-a924-7f43ef974e16';
UPDATE `sentri`.`system_pages` SET `page_location`='/portal-management/pageAccessControl.php' WHERE  `page_uuid`='c14362c2-7db2-4047-aed2-9569c0b4febf';
UPDATE `sentri`.`system_pages` SET `page_url`='/portal-management/sources/inserve' WHERE  `page_uuid`='5b167631-ba04-4452-bb8f-3ae0be8bccb0';
UPDATE `sentri`.`system_modules` SET `module_slugify`='portal-management' WHERE  `module_uuid`='0f044275-1744-444c-9627-736310d7997e';
RENAME TABLE `vc_api_tokens` TO `system_api_tokens`;
RENAME TABLE `vc_devices` TO `autop_devices`;
RENAME TABLE `vc_permissions` TO `system_permissions`;
RENAME TABLE `vc_platforms` TO `autop_platforms`;
RENAME TABLE `vc_portal_settings` TO `system_settings`;
RENAME TABLE `vc_user_group_permissions_portal` TO `system_user_group_permissions`;
RENAME TABLE `vc_user_groups` TO `system_user_groups`;
RENAME TABLE `vc_users` TO `system_users`;
RENAME TABLE `vc_vendors` TO `autop_vendors`;
DROP TABLE `vc_feedback`;
